
\documentclass[journal]{IEEEtran}
% correct bad hyphenation here
%\hyphenation{op-tical net-works semi-conduc-tor}
\hyphenation{op-tical net-works semi-conduc-tor IEEEtran}
\usepackage[latin1]{inputenc}
%\usepackage[utf8]{inputenc}
%\usepackage[applemac]{inputenc}
\usepackage{graphicx}  
\usepackage{subfigure} 
\usepackage{url}       
\usepackage{array}
\usepackage[colorlinks=false]{hyperref}
\usepackage{amsfonts}
\usepackage{amssymb}
\usepackage[dvips]{graphicx}

\usepackage{amssymb}
\usepackage{amsmath}
\usepackage{amsbsy}
\usepackage{fancyhdr}
\pagestyle{fancy}
\usepackage{hyperref}

\usepackage[final]{listings}
\usepackage[dvips]{graphicx}
\usepackage[usenames,dvipsnames]{xcolor}
\usepackage[numbered,framed]{pcks/mcode}

\begin{document}


\include{Dati}
\include{GUI}





\end{document}

